\definedescription[D]

\starttext
\D{Label} description % Label is not printed

\startD{Label} % OK, but pb with the following table
	description
\stopD

\bTABLE
\bTR
	\bTH Label \eTH % The first line is located on the left at the bottom of the table, TD works OK.
\eTR\bTR
	\bTD value \eTD
\eTR
\eTABLE

\stoptext
